\begin{optiontableAuto}
          VolumeRangeMode  &  \mc{1}{c}{--}  &         Adaptive  &  Unscaled, MinMax, RMS, Adaptive, kNN  &  Method to determine volume size \\
          KernelEstimator  &  \mc{1}{c}{--}  &              Box  &  Box, Sphere, Teepee, Gauss, Sinc3, Sinc5, Sinc7, Sinc9, Sinc11, Lanczos2, Lanczos3, Lanczos5, Lanczos8, Trim  &  Kernel estimation function \\
                DeltaFrac  &  \mc{1}{c}{--}  &                3  &  \mc{1}{l}{--}  &  nEventsMin/Max for minmax and rms volume range \\
               NEventsMin  &  \mc{1}{c}{--}  &              100  &  \mc{1}{l}{--}  &  nEventsMin for adaptive volume range \\
               NEventsMax  &  \mc{1}{c}{--}  &              200  &  \mc{1}{l}{--}  &  nEventsMax for adaptive volume range \\
           MaxVIterations  &  \mc{1}{c}{--}  &              150  &  \mc{1}{l}{--}  &  MaxVIterations for adaptive volume range \\
             InitialScale  &  \mc{1}{c}{--}  &             0.99  &  \mc{1}{l}{--}  &  InitialScale for adaptive volume range \\
               GaussSigma  &  \mc{1}{c}{--}  &              0.1  &  \mc{1}{l}{--}  &  Width (wrt volume size) of Gaussian kernel estimator \\
                 NormTree  &  \mc{1}{c}{--}  &            False  &  \mc{1}{l}{--}  &  Normalize binary search tree 
\end{optiontableAuto}
