\begin{optiontableAuto}
                  PopSize  &  \mc{1}{c}{--}  &              300  &  \mc{1}{l}{--}  &  Population size for GA \\
                    Steps  &  \mc{1}{c}{--}  &               40  &  \mc{1}{l}{--}  &  Number of steps for convergence \\
                   Cycles  &  \mc{1}{c}{--}  &                3  &  \mc{1}{l}{--}  &  Independent cycles of GA fitting \\
                 SC\_steps  &  \mc{1}{c}{--}  &               10  &  \mc{1}{l}{--}  &  Spread control, steps \\
                  SC\_rate  &  \mc{1}{c}{--}  &                5  &  \mc{1}{l}{--}  &  Spread control, rate: factor is changed depending on the rate \\
                SC\_factor  &  \mc{1}{c}{--}  &             0.95  &  \mc{1}{l}{--}  &  Spread control, factor \\
                 ConvCrit  &  \mc{1}{c}{--}  &            0.001  &  \mc{1}{l}{--}  &  Convergence criteria \\
              SaveBestGen  &  \mc{1}{c}{--}  &                1  &  \mc{1}{l}{--}  &  Saves the best n results from each generation. They are included in the last cycle \\
            SaveBestCycle  &  \mc{1}{c}{--}  &               10  &  \mc{1}{l}{--}  &  Saves the best n results from each cycle. They are included in the last cycle. The value should be set to at least 1.0 \\
                     Trim  &  \mc{1}{c}{--}  &            False  &  \mc{1}{l}{--}  &  Trim the population to PopSize after assessing the fitness of each individual \\
                     Seed  &  \mc{1}{c}{--}  &              100  &  \mc{1}{l}{--}  &  Set seed of random generator (0 gives random seeds) 
\end{optiontableAuto}
