\begin{optiontableAuto}
                        V  &  \mc{1}{c}{--}  &            False  &  \mc{1}{l}{--}  &  Verbose flag \\
                    Color  &  \mc{1}{c}{--}  &             True  &  \mc{1}{l}{--}  &  Flag for coloured screen output (default: True, if in batch mode: False) \\
          Transformations  &  \mc{1}{c}{--}  &                   &  \mc{1}{l}{--}  &  List of transformations to test; formatting example: Transformations=I;D;P;U;G,D, for identity, decorrelation, PCA, Uniform and Gaussianisation followed by decorrelation transformations \\
                   Silent  &  \mc{1}{c}{--}  &            False  &  \mc{1}{l}{--}  &  Batch mode: boolean silent flag inhibiting any output from TMVA after the creation of the factory class object (default: False) \\
          DrawProgressBar  &  \mc{1}{c}{--}  &             True  &  \mc{1}{l}{--}  &  Draw progress bar to display training, testing and evaluation schedule (default: True) \\
             AnalysisType  &  \mc{1}{c}{--}  &             Auto  &  Classification, Regression, Multiclass, Auto  &  Set the analysis type (Classification, Regression, Multiclass, Auto) (default: Auto) 
\end{optiontableAuto}
