\begin{optiontableAuto}
               ErrorLevel  &  \mc{1}{c}{--}  &                1  &  \mc{1}{l}{--}  &  TMinuit: error level: 0.5=logL fit, 1=chi-squared fit \\
               PrintLevel  &  \mc{1}{c}{--}  &               -1  &  \mc{1}{l}{--}  &  TMinuit: output level: -1=least, 0, +1=all garbage \\
              FitStrategy  &  \mc{1}{c}{--}  &                2  &  \mc{1}{l}{--}  &  TMinuit: fit strategy: 2=best \\
            PrintWarnings  &  \mc{1}{c}{--}  &            False  &  \mc{1}{l}{--}  &  TMinuit: suppress warnings \\
               UseImprove  &  \mc{1}{c}{--}  &             True  &  \mc{1}{l}{--}  &  TMinuit: use IMPROVE \\
                 UseMinos  &  \mc{1}{c}{--}  &             True  &  \mc{1}{l}{--}  &  TMinuit: use MINOS \\
                 SetBatch  &  \mc{1}{c}{--}  &            False  &  \mc{1}{l}{--}  &  TMinuit: use batch mode \\
                 MaxCalls  &  \mc{1}{c}{--}  &             1000  &  \mc{1}{l}{--}  &  TMinuit: approximate maximum number of function calls \\
                Tolerance  &  \mc{1}{c}{--}  &              0.1  &  \mc{1}{l}{--}  &  TMinuit: tolerance to the function value at the minimum 
\end{optiontableAuto}
