\section{gear\-:\-:Ti\-Xml\-Cursor Struct Reference}
\label{structgear_1_1TiXmlCursor}\index{gear\-::\-Ti\-Xml\-Cursor@{gear\-::\-Ti\-Xml\-Cursor}}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
void {\bfseries Clear} ()\label{structgear_1_1TiXmlCursor_a6079592d62c7f6172c0a8954edc7fb65}

\end{DoxyCompactItemize}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
int {\bfseries row}\label{structgear_1_1TiXmlCursor_ade65be3866d6187e4cacd37e658f789f}

\item 
int {\bfseries col}\label{structgear_1_1TiXmlCursor_a1e2453e36b8dc4dfe55451df34d2cb29}

\end{DoxyCompactItemize}


\subsection{Detailed Description}


Definition at line 92 of file tinyxml.\-h.



The documentation for this struct was generated from the following file\-:\begin{DoxyCompactItemize}
\item 
tinyxml.\-h\end{DoxyCompactItemize}
