\section{gear\-:\-:vframe Class Reference}
\label{classgear_1_1vframe}\index{gear\-::vframe@{gear\-::vframe}}


Abstract description of layers in a F\-T\-D detector.  




{\ttfamily \#include $<$F\-T\-D\-Layer\-Layout\-Impl.\-h$>$}

\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
{\bfseries vframe} (const double \&xval, const double \&yval, const double \&zval)\label{classgear_1_1vframe_a2160e10e5e37557c66fee5cd7b5915f1}

\end{DoxyCompactItemize}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
double {\bfseries x}\label{classgear_1_1vframe_ae56ab6451e8af861d87d569394dc44f1}

\item 
double {\bfseries y}\label{classgear_1_1vframe_a8238b1bda542ef6940fc1f1915b1508a}

\item 
double {\bfseries z}\label{classgear_1_1vframe_af7d5d7297a95f8ebe81bb699c83759cf}

\end{DoxyCompactItemize}


\subsection{Detailed Description}
Abstract description of layers in a F\-T\-D detector. 

\par
 This assumes a symmetric layout of supports (petals), arranged in layers (disks) placed at z-\/position. \par
 The sensitive area is assumed to be inside the petals but can be positioned independently.

\begin{DoxyAuthor}{Author}
J. Duarte Campderros, I\-F\-C\-A (Based at V\-X\-D\-Layer\-Layout) 
\end{DoxyAuthor}
\begin{DoxyVersion}{Version}
\$\-Id\-: 
\end{DoxyVersion}


Definition at line 23 of file F\-T\-D\-Layer\-Layout\-Impl.\-h.



The documentation for this class was generated from the following file\-:\begin{DoxyCompactItemize}
\item 
F\-T\-D\-Layer\-Layout\-Impl.\-h\end{DoxyCompactItemize}
