\section{gear\-:\-:Ti\-Xml\-Base\-:\-:String\-To\-Buffer Class Reference}
\label{classgear_1_1TiXmlBase_1_1StringToBuffer}\index{gear\-::\-Ti\-Xml\-Base\-::\-String\-To\-Buffer@{gear\-::\-Ti\-Xml\-Base\-::\-String\-To\-Buffer}}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
{\bfseries String\-To\-Buffer} (const T\-I\-X\-M\-L\-\_\-\-S\-T\-R\-I\-N\-G \&str)\label{classgear_1_1TiXmlBase_1_1StringToBuffer_ad9fc355f9aeb669034fa58346ebeece6}

\end{DoxyCompactItemize}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
char $\ast$ {\bfseries buffer}\label{classgear_1_1TiXmlBase_1_1StringToBuffer_af51cfae8ca0045c7772d2238c491f150}

\end{DoxyCompactItemize}


\subsection{Detailed Description}


Definition at line 228 of file tinyxml.\-h.



The documentation for this class was generated from the following files\-:\begin{DoxyCompactItemize}
\item 
tinyxml.\-h\item 
tinyxml.\-cc\end{DoxyCompactItemize}
