\section{Pfo\-Analysis Class Reference}
\label{classPfoAnalysis}\index{Pfo\-Analysis@{Pfo\-Analysis}}


\doxyref{Pfo\-Analysis}{p.}{classPfoAnalysis} class.  




{\ttfamily \#include $<$Pfo\-Analysis.\-h$>$}

Inheritance diagram for Pfo\-Analysis\-:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classPfoAnalysis}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
{\bf Pfo\-Analysis} ()\label{classPfoAnalysis_abcbd370cbff3da17bc77ed8dc56f632e}

\begin{DoxyCompactList}\small\item\em Default constructor. \end{DoxyCompactList}\item 
virtual Processor $\ast$ {\bf new\-Processor} ()\label{classPfoAnalysis_a5da0ff11a8229ae1d01c77f47ec88e0b}

\begin{DoxyCompactList}\small\item\em Create new processor. \end{DoxyCompactList}\item 
virtual void {\bf init} ()\label{classPfoAnalysis_a7279b0ce688c1bc1526f4a89074011a0}

\begin{DoxyCompactList}\small\item\em Initialize, called at startup. \end{DoxyCompactList}\item 
virtual void {\bf process\-Run\-Header} (lcio\-::\-L\-C\-Run\-Header $\ast$p\-L\-C\-Run\-Header)
\begin{DoxyCompactList}\small\item\em Process run header. \end{DoxyCompactList}\item 
virtual void {\bf process\-Event} (E\-V\-E\-N\-T\-::\-L\-C\-Event $\ast$p\-L\-C\-Event)
\begin{DoxyCompactList}\small\item\em Process event, main entry point. \end{DoxyCompactList}\item 
virtual void {\bf check} (E\-V\-E\-N\-T\-::\-L\-C\-Event $\ast$p\-L\-C\-Event)
\begin{DoxyCompactList}\small\item\em Checks for event. \end{DoxyCompactList}\item 
virtual void {\bf end} ()\label{classPfoAnalysis_a978e3fa22856d2c6b959256db58811f1}

\begin{DoxyCompactList}\small\item\em End, called at shutdown. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
\doxyref{Pfo\-Analysis}{p.}{classPfoAnalysis} class. 

\subsection{Member Function Documentation}
\index{Pfo\-Analysis@{Pfo\-Analysis}!check@{check}}
\index{check@{check}!PfoAnalysis@{Pfo\-Analysis}}
\subsubsection[{check}]{\setlength{\rightskip}{0pt plus 5cm}void Pfo\-Analysis\-::check (
\begin{DoxyParamCaption}
\item[{E\-V\-E\-N\-T\-::\-L\-C\-Event $\ast$}]{p\-L\-C\-Event}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily [virtual]}}\label{classPfoAnalysis_a8b7a35fc2f28dde4a74f52a37f78f71c}


Checks for event. 


\begin{DoxyParams}{Parameters}
{\em p\-L\-C\-Event} & the lc event \\
\hline
\end{DoxyParams}
\index{Pfo\-Analysis@{Pfo\-Analysis}!process\-Event@{process\-Event}}
\index{process\-Event@{process\-Event}!PfoAnalysis@{Pfo\-Analysis}}
\subsubsection[{process\-Event}]{\setlength{\rightskip}{0pt plus 5cm}void Pfo\-Analysis\-::process\-Event (
\begin{DoxyParamCaption}
\item[{E\-V\-E\-N\-T\-::\-L\-C\-Event $\ast$}]{p\-L\-C\-Event}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily [virtual]}}\label{classPfoAnalysis_a853ca7921130959e8b5cc50c450c4a71}


Process event, main entry point. 


\begin{DoxyParams}{Parameters}
{\em p\-L\-C\-Event} & the lc event \\
\hline
\end{DoxyParams}


References pandora\-\_\-analysis\-::\-Calibration\-Helper\-::\-Calibrate().

\index{Pfo\-Analysis@{Pfo\-Analysis}!process\-Run\-Header@{process\-Run\-Header}}
\index{process\-Run\-Header@{process\-Run\-Header}!PfoAnalysis@{Pfo\-Analysis}}
\subsubsection[{process\-Run\-Header}]{\setlength{\rightskip}{0pt plus 5cm}void Pfo\-Analysis\-::process\-Run\-Header (
\begin{DoxyParamCaption}
\item[{lcio\-::\-L\-C\-Run\-Header $\ast$}]{p\-L\-C\-Run\-Header}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily [virtual]}}\label{classPfoAnalysis_aa2a58f8851ba25d9abfb2b7cd57889c8}


Process run header. 


\begin{DoxyParams}{Parameters}
{\em p\-L\-C\-Run\-Header} & the lc run header \\
\hline
\end{DoxyParams}


The documentation for this class was generated from the following files\-:\begin{DoxyCompactItemize}
\item 
Pfo\-Analysis.\-h\item 
Pfo\-Analysis.\-cc\end{DoxyCompactItemize}
