\section{Marlin\-Trk\-:\-:Helix\-Fit Class Reference}
\label{classMarlinTrk_1_1HelixFit}\index{Marlin\-Trk\-::\-Helix\-Fit@{Marlin\-Trk\-::\-Helix\-Fit}}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
int {\bfseries fast\-Helix\-Fit} (int npt, double $\ast$xf, double $\ast$yf, float $\ast$rf, float $\ast$pf, double $\ast$wf, float $\ast$zf, float $\ast$wzf, int iopt, float $\ast$vv0, float $\ast$ee0, float \&ch2ph, float \&ch2z)\label{classMarlinTrk_1_1HelixFit_a67962d1ddae97f10473adba195d4a382}

\end{DoxyCompactItemize}


The documentation for this class was generated from the following files\-:\begin{DoxyCompactItemize}
\item 
Helix\-Fit.\-h\item 
Helix\-Fit.\-cc\end{DoxyCompactItemize}
