\section{marlintpc\-:\-:Pulse\-Finder\-Tester\-:\-:Pulse\-Properties Struct Reference}
\label{structmarlintpc_1_1PulseFinderTester_1_1PulseProperties}\index{marlintpc\-::\-Pulse\-Finder\-Tester\-::\-Pulse\-Properties@{marlintpc\-::\-Pulse\-Finder\-Tester\-::\-Pulse\-Properties}}


A struct to store the pulse properties we are checking.  




{\ttfamily \#include $<$Pulse\-Finder\-Tester.\-h$>$}

\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
{\bfseries Pulse\-Properties} (size\-\_\-t n, int q, float t, float c)\label{structmarlintpc_1_1PulseFinderTester_1_1PulseProperties_a0295cf755b2544b92aef69c4fb6b7f83}

\end{DoxyCompactItemize}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
size\-\_\-t {\bfseries n\-Samples}\label{structmarlintpc_1_1PulseFinderTester_1_1PulseProperties_aec9d7f904d1d6a431343b440ff47516f}

\item 
int {\bfseries quality}\label{structmarlintpc_1_1PulseFinderTester_1_1PulseProperties_acb1c514fc18a84ed081e7cc12b73a64a}

\item 
float {\bfseries time}\label{structmarlintpc_1_1PulseFinderTester_1_1PulseProperties_a36549ddc6b5da736cb3e65d0b137bb4b}

\item 
float {\bfseries charge}\label{structmarlintpc_1_1PulseFinderTester_1_1PulseProperties_aac20e5113084d29d68a4dcdfc467a844}

\end{DoxyCompactItemize}


\subsection{Detailed Description}
A struct to store the pulse properties we are checking. 

The documentation for this struct was generated from the following file\-:\begin{DoxyCompactItemize}
\item 
Pulse\-Finder\-Tester.\-h\end{DoxyCompactItemize}
