\section{marlintpc\-:\-:Element2\-D Struct Reference}
\label{structmarlintpc_1_1Element2D}\index{marlintpc\-::\-Element2\-D@{marlintpc\-::\-Element2\-D}}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
gear\-::\-Vector2\-D {\bfseries p} [4]\label{structmarlintpc_1_1Element2D_afe03058383a51ba8ba06412dd1310d89}

\item 
gear\-::\-Vector2\-D {\bfseries shift} [4]\label{structmarlintpc_1_1Element2D_a5d766bc10d5181117ca751c66d41a8d4}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\-:\begin{DoxyCompactItemize}
\item 
Photoelectric\-Distortions\-Calculator.\-h\end{DoxyCompactItemize}
