\section{marlintpc\-:\-:Test\-Field\-Setting\-Processor Class Reference}
\label{classmarlintpc_1_1TestFieldSettingProcessor}\index{marlintpc\-::\-Test\-Field\-Setting\-Processor@{marlintpc\-::\-Test\-Field\-Setting\-Processor}}


Processor to test the field setting listener.  




{\ttfamily \#include $<$Test\-Field\-Setting\-Processor.\-h$>$}

Inheritance diagram for marlintpc\-:\-:Test\-Field\-Setting\-Processor\-:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classmarlintpc_1_1TestFieldSettingProcessor}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
virtual Processor $\ast$ {\bfseries new\-Processor} ()\label{classmarlintpc_1_1TestFieldSettingProcessor_a75e84f2a4ab566957812b22b0a6ad962}

\item 
virtual void {\bfseries init} ()\label{classmarlintpc_1_1TestFieldSettingProcessor_a59d88beb6e38e25ae01e700138006188}

\item 
virtual void {\bfseries process\-Run\-Header} (lcio\-::\-L\-C\-Run\-Header $\ast$run)\label{classmarlintpc_1_1TestFieldSettingProcessor_a4088ca1ec867ef216f9be676045748ba}

\item 
virtual void {\bfseries process\-Event} (lcio\-::\-L\-C\-Event $\ast$evt)\label{classmarlintpc_1_1TestFieldSettingProcessor_ad8c87de51fa72f3af6efad67104eeabd}

\item 
virtual void {\bfseries check} (lcio\-::\-L\-C\-Event $\ast$evt)\label{classmarlintpc_1_1TestFieldSettingProcessor_abc45ad8122baf577360fd9986fab7a1a}

\item 
virtual void {\bfseries end} ()\label{classmarlintpc_1_1TestFieldSettingProcessor_a0b3f7af20deae5f314832a3ab2ca872b}

\end{DoxyCompactItemize}
\subsection*{Protected Attributes}
\begin{DoxyCompactItemize}
\item 
std\-::string {\bf \-\_\-input\-Col\-Name\-Raw\-Data}\label{classmarlintpc_1_1TestFieldSettingProcessor_a28aefdae8fb8e6a093ea849fdc86e0dc}

\begin{DoxyCompactList}\small\item\em Name of the raw data input collection. \end{DoxyCompactList}\item 
std\-::string {\bf \-\_\-input\-Col\-Name\-Pules}\label{classmarlintpc_1_1TestFieldSettingProcessor_a988b767b88ae807511daf942123a725e}

\begin{DoxyCompactList}\small\item\em Name of the pulse data input collection. \end{DoxyCompactList}\item 
std\-::string {\bfseries \-\_\-input\-Field\-Setting\-Collection\-Name}\label{classmarlintpc_1_1TestFieldSettingProcessor_aac6976b2b56ac748703acc062e60c0a7}

\end{DoxyCompactItemize}


\subsection{Detailed Description}
Processor to test the field setting listener. 

Serves also as an example on how to use access Field\-Settings

\begin{DoxyAuthor}{Author}
Klaus Zenker, D\-E\-S\-Y
\end{DoxyAuthor}


The documentation for this class was generated from the following files\-:\begin{DoxyCompactItemize}
\item 
Test\-Field\-Setting\-Processor.\-h\item 
Test\-Field\-Setting\-Processor.\-cc\end{DoxyCompactItemize}
