marlintpc::HitDistancesProcessor marlintpc::ZBinTemplateProcessor< N_1D_HISTOS_HIT_DISTANCES_PROCESSOR, N_2D_HISTOS_HIT_DISTANCES_PROCESSOR >

Processor