\section{Ionisation\-Point Struct Reference}
\label{structIonisationPoint}\index{Ionisation\-Point@{Ionisation\-Point}}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
double {\bfseries x}\label{structIonisationPoint_a8f028e72134332a8f88b1d5b5c194cc8}

\item 
double {\bfseries y}\label{structIonisationPoint_a4ef01406be5b864e60b9c528b7cd7673}

\item 
double {\bfseries z}\label{structIonisationPoint_a51c787d7cf099f84e1830b91ccda624c}

\item 
double {\bfseries eloss}\label{structIonisationPoint_a396738c18568e989fbab8da107a8c1fd}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following files\-:\begin{DoxyCompactItemize}
\item 
C\-C\-D\-Digitizer.\-h\item 
V\-T\-X\-Digitizer.\-h\end{DoxyCompactItemize}
