\section{Core\-Calib2 Struct Reference}
\label{structCoreCalib2}\index{Core\-Calib2@{Core\-Calib2}}


container for holding the numbers needed for energy estimation  




{\ttfamily \#include $<$K\-I\-Tutil.\-h$>$}

\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
int {\bf level}\label{structCoreCalib2_ade96914ef5404d43edaf601fe6d23bde}

\begin{DoxyCompactList}\small\item\em level of cluster \end{DoxyCompactList}\item 
double {\bf Enom}
\begin{DoxyCompactList}\small\item\em nominal i.\-e. \end{DoxyCompactList}\item 
double {\bf a}\label{structCoreCalib2_a0dce9c60344c4fe96ca483e4fe5a6081}

\begin{DoxyCompactList}\small\item\em Eestimate = a+b$\ast$\-Ecore , a parameter of this funcition. \end{DoxyCompactList}\item 
double {\bf b}\label{structCoreCalib2_ac2b162dfb38f859a17683982659ab3ce}

\begin{DoxyCompactList}\small\item\em Eestimate = a+b$\ast$\-Ecore , b parameter of this funcition. \end{DoxyCompactList}\item 
double {\bf Emin}\label{structCoreCalib2_a7c0a96cf0f5cf766a812e79ce554d71f}

\begin{DoxyCompactList}\small\item\em lower validity range of energy estimation funciton in Ge\-V \end{DoxyCompactList}\item 
double {\bf Emax}\label{structCoreCalib2_a1513a365dba6f7fe7addf810132c64d2}

\begin{DoxyCompactList}\small\item\em upper validity range of energy estimation funciton in Ge\-V \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
container for holding the numbers needed for energy estimation 

\subsection{Member Data Documentation}
\index{Core\-Calib2@{Core\-Calib2}!Enom@{Enom}}
\index{Enom@{Enom}!CoreCalib2@{Core\-Calib2}}
\subsubsection[{Enom}]{\setlength{\rightskip}{0pt plus 5cm}double Core\-Calib2\-::\-Enom}\label{structCoreCalib2_a71a46968f39a87a64c2714dd7f2edd64}


nominal i.\-e. 

input energy in Ge\-V 

The documentation for this struct was generated from the following file\-:\begin{DoxyCompactItemize}
\item 
K\-I\-Tutil.\-h\end{DoxyCompactItemize}
