\section{Simple\-Muon\-Digi Class Reference}
\label{classSimpleMuonDigi}\index{Simple\-Muon\-Digi@{Simple\-Muon\-Digi}}


=== \doxyref{Simple\-Muon\-Digi}{p.}{classSimpleMuonDigi} Processor === \par
 Simple calorimeter digitizer for the muon detectors.  




{\ttfamily \#include $<$Simple\-Muon\-Digi.\-h$>$}

Inheritance diagram for Simple\-Muon\-Digi\-:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classSimpleMuonDigi}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
virtual Processor $\ast$ {\bfseries new\-Processor} ()\label{classSimpleMuonDigi_a9aa3cb6e09e6d6afde2c2de9c6b3ce10}

\item 
virtual void {\bfseries init} ()\label{classSimpleMuonDigi_a2f7b42cd80364087b28eeae3d2aae7b7}

\item 
virtual void {\bfseries process\-Run\-Header} (L\-C\-Run\-Header $\ast$run)\label{classSimpleMuonDigi_a5dc9b11ccadce5ddf94cda13f9a73dae}

\item 
virtual void {\bfseries process\-Event} (L\-C\-Event $\ast$evt)\label{classSimpleMuonDigi_a8a2b0596b9b38aba95603d496df11b07}

\item 
virtual void {\bfseries check} (L\-C\-Event $\ast$evt)\label{classSimpleMuonDigi_ab0ece2dfcd644fcdf18fab55fd5e8ff7}

\item 
virtual void {\bfseries end} ()\label{classSimpleMuonDigi_a88d1ec678be4c4f1502a4cf4e58ab409}

\item 
bool {\bfseries use\-Layer} (C\-H\-T\-::\-Layout calo\-Layout, unsigned int layer)\label{classSimpleMuonDigi_a4b21db687b2274a7741d928570993f4d}

\end{DoxyCompactItemize}
\subsection*{Protected Attributes}
\begin{DoxyCompactItemize}
\item 
int {\bfseries \-\_\-n\-Run}\label{classSimpleMuonDigi_a38d9c545a995ee7dd65766cf523dd1a1}

\item 
int {\bfseries \-\_\-n\-Evt}\label{classSimpleMuonDigi_a54fb11d02e8183491c57a8304c3ff3bf}

\item 
Int\-Vec {\bfseries \-\_\-layers\-To\-Keep\-Barrel\-Vec}\label{classSimpleMuonDigi_a23ae95f6e6264a1c9ee1db051722fd0f}

\item 
Int\-Vec {\bfseries \-\_\-layers\-To\-Keep\-Endcap\-Vec}\label{classSimpleMuonDigi_aad4d05c212a811fc25f4eaa32cf17b34}

\item 
std\-::vector$<$ bool $>$ {\bfseries \-\_\-use\-Layers\-Barrel\-Vec}\label{classSimpleMuonDigi_ad07efce2992844b23c7b36121079a6af}

\item 
std\-::vector$<$ bool $>$ {\bfseries \-\_\-use\-Layers\-Endcap\-Vec}\label{classSimpleMuonDigi_ab97b409b07420ac99d23006a4b1f237b}

\item 
std\-::vector$<$ std\-::string $>$ {\bfseries \-\_\-muon\-Collections}\label{classSimpleMuonDigi_a45cd458a22afebcf5226f0f803bca58d}

\item 
std\-::string {\bfseries \-\_\-output\-Muon\-Collection}\label{classSimpleMuonDigi_aaec945a45dad2459926a659628f8aeac}

\item 
std\-::string {\bfseries \-\_\-output\-Rel\-Collection}\label{classSimpleMuonDigi_a9162b709b8045522a5138884387aa65b}

\item 
std\-::string {\bfseries \-\_\-cell\-I\-D\-Layer\-String}\label{classSimpleMuonDigi_ae782f10512dce1c49a7344158574d0bf}

\item 
float {\bfseries \-\_\-threshold\-Muon}\label{classSimpleMuonDigi_aeb075c3310dee11333fcd05d2d106ff1}

\item 
float {\bfseries \-\_\-calibr\-Coeff\-Muon}\label{classSimpleMuonDigi_a9720e0e775139c0a34b5742b8a757739}

\item 
float {\bfseries \-\_\-max\-Hit\-Energy\-Muon}\label{classSimpleMuonDigi_a50186ba56d2b0add68e484649e89ad8a}

\end{DoxyCompactItemize}


\subsection{Detailed Description}
=== \doxyref{Simple\-Muon\-Digi}{p.}{classSimpleMuonDigi} Processor === \par
 Simple calorimeter digitizer for the muon detectors. 

Converts Sim\-Calorimeter\-Hit collections to one Calorimeter\-Hit collection applying a threshold and an calibration constant...

\begin{DoxyVersion}{Version}

\end{DoxyVersion}
\begin{DoxyParagraph}{Id\-:}
\doxyref{Simple\-Muon\-Digi.\-h}{p.}{SimpleMuonDigi_8h_source} 4761 2015-\/02-\/12 15\-:11\-:51\-Z gaede 
\end{DoxyParagraph}


The documentation for this class was generated from the following file\-:\begin{DoxyCompactItemize}
\item 
Simple\-Muon\-Digi.\-h\end{DoxyCompactItemize}
