\section{Scintillator\-Ppd\-Digi Class Reference}
\label{classScintillatorPpdDigi}\index{Scintillator\-Ppd\-Digi@{Scintillator\-Ppd\-Digi}}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
void {\bfseries set\-P\-Eper\-M\-I\-P} (float x)\label{classScintillatorPpdDigi_a99d6c429deeceac13c66d0ba7b114e7c}

\item 
void {\bfseries set\-Calib\-M\-I\-P} (float x)\label{classScintillatorPpdDigi_acb2687df72de82c19935b95772da3303}

\item 
void {\bfseries set\-N\-Pix} (int x)\label{classScintillatorPpdDigi_a6180cfe55b7fbd6e18b8781b312b9d44}

\item 
void {\bfseries set\-Random\-Mis\-Calib\-N\-Pix} (float x)\label{classScintillatorPpdDigi_a19dac4cdcb22f01f961857e66d470940}

\item 
void {\bfseries set\-Pix\-Spread} (float x)\label{classScintillatorPpdDigi_ac559ba9f8eec4e8371167d88b10264b6}

\item 
void {\bfseries set\-Elec\-Noise} (float x)\label{classScintillatorPpdDigi_a022aa05baa71f68b976de024670e91d5}

\item 
void {\bfseries set\-Elec\-Range} (float x)\label{classScintillatorPpdDigi_a573a08437bafbbc62798202f03614c4b}

\item 
float {\bfseries get\-Digitised\-Energy} (float energy)\label{classScintillatorPpdDigi_af771ae3b93e068349d4604dcba82f3f0}

\item 
void {\bfseries print\-Parameters} ()\label{classScintillatorPpdDigi_a84bb81ea9cfc943c51f6367ce33a23dc}

\end{DoxyCompactItemize}


The documentation for this class was generated from the following file\-:\begin{DoxyCompactItemize}
\item 
Scintillator\-Ppd\-Digi.\-h\end{DoxyCompactItemize}
