\section{Check\-Plots Class Reference}
\label{classCheckPlots}\index{Check\-Plots@{Check\-Plots}}


This processor provides check plots.  




{\ttfamily \#include $<$Check\-Plots.\-h$>$}

Inheritance diagram for Check\-Plots\-:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classCheckPlots}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
virtual Processor $\ast$ {\bfseries new\-Processor} ()\label{classCheckPlots_aba3ebcb37c4b16b588237ed5c42a4780}

\item 
virtual void {\bfseries init} ()\label{classCheckPlots_a2b56af76f01538f2e85e483872c11577}

\item 
virtual void {\bfseries process\-Run\-Header} (L\-C\-Run\-Header $\ast$run)\label{classCheckPlots_a17027a3be484eab64450792c9eee337e}

\item 
virtual void {\bfseries process\-Event} (L\-C\-Event $\ast$evt)\label{classCheckPlots_acea9eb2f989b8337d3ae6a2d1d4e25a1}

\item 
virtual void {\bfseries check} (L\-C\-Event $\ast$evt)\label{classCheckPlots_a34e7595a13aae826d3147d3defb3c8d5}

\item 
virtual void {\bfseries end} ()\label{classCheckPlots_ae82de34dc99632e2a61ff883dd898cc6}

\end{DoxyCompactItemize}


\subsection{Detailed Description}
This processor provides check plots. 

The plots are arranged in the following different categories\-: \par

\begin{DoxyEnumerate}
\item M\-C particle related plots \par

\item Plots related to the simulated hits in tracking and calorimeter devices \par

\item Plots related to the hits in tracking and calorimeter devices \par

\item Plots related to tracks \par

\item Plots related to reconstructed particles \par

\item more to come \par
 \par
 Steering parameters\-: \par
 Fill\-M\-C\-Gen\-: toggles the check plots for the M\-C particles with generator status == 1 ( 0 or 1 ) \par
 Fill\-M\-C\-Sim \-: toggles the check plots for the M\-C particles with generator status != 1 ( 0 or 1 ) \par
 Fill\-Sim\-Calo \-: produces check plots for the simulated calorimeter hits \par
 Sim\-E\-Cut \-: cut on the simulated energy in the cell. Only energies above this cut are taken into account. \par
 Fill\-Calo \-: produces check plots for the calorimeter hits \par
 E\-Cut \-: cut on the energy in the cell. Only energies above this cut are taken into account. \par
 Theta\-Cut \-: cut in theta to assign particles which are lost in the beam pipe Fill\-Tracks \-: toggles the check plots for the tracks Col\-Name\-Tracks \-: name of the L\-C\-Collection of tracks Col\-Name\-Relation\-Track\-To\-M\-C\-P \-: name of the L\-C\-Relation collection connecting the tracks and the corresponding M\-C particle Fill\-Reconstructed\-Particles \-: toggles the check plots for the reconstructed paricles Col\-Name\-Reconstructed\-Particles \-: name of the L\-C\-Collection of reconstructed paricles
\end{DoxyEnumerate}

\begin{DoxyAuthor}{Author}
O. Wendt (D\-E\-S\-Y) 
\end{DoxyAuthor}
\begin{DoxyVersion}{Version}

\end{DoxyVersion}
\begin{DoxyParagraph}{Id\-:}
\doxyref{Check\-Plots.\-h}{p.}{CheckPlots_8h_source} 2553 2011-\/09-\/20 14\-:50\-:20\-Z gaede 
\end{DoxyParagraph}


The documentation for this class was generated from the following file\-:\begin{DoxyCompactItemize}
\item 
Check\-Plots.\-h\end{DoxyCompactItemize}
