\section{Calibration Class Reference}
\label{classCalibration}\index{Calibration@{Calibration}}
Inheritance diagram for Calibration\-:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=1.958042cm]{classCalibration}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
{\bf Calibration} (int nevt, int n1, int n2, int n3, double en1, double en2, double en3, double enr)\label{classCalibration_a200ae889e0cabaed2bbd12ff6dba80d2}

\begin{DoxyCompactList}\small\item\em Convenient constructor. \end{DoxyCompactList}\item 
{\bf Calibration} (E\-V\-E\-N\-T\-::\-L\-C\-Object $\ast$obj)\label{classCalibration_ad056fafebe21c369dead56a4e9fe85e8}

\begin{DoxyCompactList}\small\item\em 'Copy constructor' needed to interpret L\-C\-Collection read from file/database. \end{DoxyCompactList}\item 
virtual {\bf $\sim$\-Calibration} ()\label{classCalibration_a0501cc4f9aa175d4015e0f0bc5cf5c31}

\begin{DoxyCompactList}\small\item\em Important for memory handling. \end{DoxyCompactList}\item 
int {\bfseries get\-N\-Evt} ()\label{classCalibration_a93ef96a1be95c41ae4bc2c5366342974}

\item 
int {\bfseries get\-Nhit1} ()\label{classCalibration_a23932ee818cb6a5fbc316bdc7b5726b8}

\item 
int {\bfseries get\-Nhit2} ()\label{classCalibration_a4bcd9b6908b54530e31034e07174bb4b}

\item 
int {\bfseries get\-Nhit3} ()\label{classCalibration_a04628d1f349b7ddec43308266b8dfb67}

\item 
double {\bfseries get\-Enr1} ()\label{classCalibration_aaef6edeef9e0847eb44f3ef874ed534e}

\item 
double {\bfseries get\-Enr2} ()\label{classCalibration_a1dd1ab6961a8ef3dc7c2d467ade64c14}

\item 
double {\bfseries get\-Enr3} ()\label{classCalibration_ad542399f3d7df40e84a472657ae4b3aa}

\item 
double {\bfseries get\-Enr4} ()\label{classCalibration_a4636b750f183edadb81fc0e44494731e}

\item 
const std\-::string {\bfseries get\-Type\-Name} () const \label{classCalibration_a845afc9c2dbca9454bbc0be3fb625c51}

\item 
const std\-::string {\bfseries get\-Data\-Description} () const \label{classCalibration_a7cb86cdc5eb4d807a0aeebd5458f4cdb}

\end{DoxyCompactItemize}


The documentation for this class was generated from the following file\-:\begin{DoxyCompactItemize}
\item 
Calibration.\-h\end{DoxyCompactItemize}
