\section{Calo\-Hit\-Creator\-:\-:Settings Class Reference}
\label{classCaloHitCreator_1_1Settings}\index{Calo\-Hit\-Creator\-::\-Settings@{Calo\-Hit\-Creator\-::\-Settings}}


\doxyref{Settings}{p.}{classCaloHitCreator_1_1Settings} class.  




{\ttfamily \#include $<$Calo\-Hit\-Creator.\-h$>$}

\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
{\bf Settings} ()\label{classCaloHitCreator_1_1Settings_af5cc5119190fb51504e72c3bde0e5530}

\begin{DoxyCompactList}\small\item\em Default constructor. \end{DoxyCompactList}\end{DoxyCompactItemize}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
String\-Vector {\bf m\-\_\-e\-Cal\-Calo\-Hit\-Collections}\label{classCaloHitCreator_1_1Settings_a2b961a26c91d4ffb02854d09b8734097}

\begin{DoxyCompactList}\small\item\em The ecal calorimeter hit collections. \end{DoxyCompactList}\item 
String\-Vector {\bf m\-\_\-h\-Cal\-Calo\-Hit\-Collections}\label{classCaloHitCreator_1_1Settings_a2048427b43bdc005b6b0e75aea305779}

\begin{DoxyCompactList}\small\item\em The hcal calorimeter hit collections. \end{DoxyCompactList}\item 
String\-Vector {\bf m\-\_\-l\-Cal\-Calo\-Hit\-Collections}\label{classCaloHitCreator_1_1Settings_aeac92c830ac941715546c381afbc91a8}

\begin{DoxyCompactList}\small\item\em The lcal calorimeter hit collections. \end{DoxyCompactList}\item 
String\-Vector {\bf m\-\_\-l\-H\-Cal\-Calo\-Hit\-Collections}\label{classCaloHitCreator_1_1Settings_a99d4853dba8d489cb4d6e64f6c80d84d}

\begin{DoxyCompactList}\small\item\em The lhcal calorimeter hit collections. \end{DoxyCompactList}\item 
String\-Vector {\bf m\-\_\-muon\-Calo\-Hit\-Collections}\label{classCaloHitCreator_1_1Settings_a1a043b6d59dc8780747fac01c390fe3d}

\begin{DoxyCompactList}\small\item\em The muon calorimeter hit collections. \end{DoxyCompactList}\item 
float {\bf m\-\_\-absorber\-Rad\-Length\-E\-Cal}\label{classCaloHitCreator_1_1Settings_a10a0249329f5d549be853abae2515250}

\begin{DoxyCompactList}\small\item\em The absorber radiation length in the E\-Cal. \end{DoxyCompactList}\item 
float {\bf m\-\_\-absorber\-Int\-Length\-E\-Cal}\label{classCaloHitCreator_1_1Settings_a378decd7c24d0126501c35b3c57749ab}

\begin{DoxyCompactList}\small\item\em The absorber interaction length in the E\-Cal. \end{DoxyCompactList}\item 
float {\bf m\-\_\-absorber\-Rad\-Length\-H\-Cal}\label{classCaloHitCreator_1_1Settings_a9cc50168453aa9dcb3f9e96987cf18c2}

\begin{DoxyCompactList}\small\item\em The absorber radiation length in the H\-Cal. \end{DoxyCompactList}\item 
float {\bf m\-\_\-absorber\-Int\-Length\-H\-Cal}\label{classCaloHitCreator_1_1Settings_a19095b7fe77bebff21265530438aac4c}

\begin{DoxyCompactList}\small\item\em The absorber interaction length in the H\-Cal. \end{DoxyCompactList}\item 
float {\bf m\-\_\-absorber\-Rad\-Length\-Other}\label{classCaloHitCreator_1_1Settings_a69ee321391674c0716cbe17406763992}

\begin{DoxyCompactList}\small\item\em The absorber radiation length in other detector regions. \end{DoxyCompactList}\item 
float {\bf m\-\_\-absorber\-Int\-Length\-Other}\label{classCaloHitCreator_1_1Settings_ac08c769223dd8c050b5d8624d3171c7e}

\begin{DoxyCompactList}\small\item\em The absorber interaction length in other detector regions. \end{DoxyCompactList}\item 
float {\bf m\-\_\-e\-Cal\-To\-Mip}\label{classCaloHitCreator_1_1Settings_a3877b4aaa7b690c45bdf5544953d8330}

\begin{DoxyCompactList}\small\item\em The calibration from deposited E\-Cal energy to mip. \end{DoxyCompactList}\item 
float {\bf m\-\_\-h\-Cal\-To\-Mip}\label{classCaloHitCreator_1_1Settings_ac3755e0920afcae9cabb537e72a7c661}

\begin{DoxyCompactList}\small\item\em The calibration from deposited H\-Cal energy to mip. \end{DoxyCompactList}\item 
float {\bf m\-\_\-muon\-To\-Mip}\label{classCaloHitCreator_1_1Settings_ac4f136c13ec64562c9239f2d341621cd}

\begin{DoxyCompactList}\small\item\em The calibration from deposited Muon energy to mip. \end{DoxyCompactList}\item 
float {\bf m\-\_\-e\-Cal\-Mip\-Threshold}\label{classCaloHitCreator_1_1Settings_a9ec6f8bbec9d11e890301a3e11fe17c0}

\begin{DoxyCompactList}\small\item\em Threshold for creating calo hits in the E\-Cal, units mip. \end{DoxyCompactList}\item 
float {\bf m\-\_\-h\-Cal\-Mip\-Threshold}\label{classCaloHitCreator_1_1Settings_aece12a45091c03d97c461d4ee6cc4c42}

\begin{DoxyCompactList}\small\item\em Threshold for creating calo hits in the H\-Cal, units mip. \end{DoxyCompactList}\item 
float {\bf m\-\_\-muon\-Mip\-Threshold}\label{classCaloHitCreator_1_1Settings_a1961e6640a17a8244dbb727ef6bf2460}

\begin{DoxyCompactList}\small\item\em Threshold for creating calo hits in the H\-Cal, units mip. \end{DoxyCompactList}\item 
float {\bf m\-\_\-e\-Cal\-To\-E\-M\-Ge\-V}\label{classCaloHitCreator_1_1Settings_a16532465c8d240dce0cd95e5dbdae8c3}

\begin{DoxyCompactList}\small\item\em The calibration from deposited E\-Cal energy to E\-M energy. \end{DoxyCompactList}\item 
float {\bf m\-\_\-e\-Cal\-To\-Had\-Ge\-V\-Barrel}\label{classCaloHitCreator_1_1Settings_ae9f3f059cc6a937d1bf2bf6309b58c58}

\begin{DoxyCompactList}\small\item\em The calibration from deposited E\-Cal barrel energy to hadronic energy. \end{DoxyCompactList}\item 
float {\bf m\-\_\-e\-Cal\-To\-Had\-Ge\-V\-End\-Cap}\label{classCaloHitCreator_1_1Settings_ab0f566760d1aa23f53d17767173493a9}

\begin{DoxyCompactList}\small\item\em The calibration from deposited E\-Cal endcap energy to hadronic energy. \end{DoxyCompactList}\item 
float {\bf m\-\_\-h\-Cal\-To\-E\-M\-Ge\-V}\label{classCaloHitCreator_1_1Settings_a94f8a1c502db9af52f7e0fc335f2a15a}

\begin{DoxyCompactList}\small\item\em The calibration from deposited H\-Cal energy to E\-M energy. \end{DoxyCompactList}\item 
float {\bf m\-\_\-h\-Cal\-To\-Had\-Ge\-V}\label{classCaloHitCreator_1_1Settings_a252d3b73f3bfd58d256cd4b6dee11347}

\begin{DoxyCompactList}\small\item\em The calibration from deposited H\-Cal energy to hadronic energy. \end{DoxyCompactList}\item 
int {\bf m\-\_\-muon\-Digital\-Hits}\label{classCaloHitCreator_1_1Settings_a9e73e03f02852ed998fb69935ab3f97f}

\begin{DoxyCompactList}\small\item\em Muon hits are treated as digital (energy from hit count) \end{DoxyCompactList}\item 
float {\bf m\-\_\-muon\-Hit\-Energy}\label{classCaloHitCreator_1_1Settings_a06e9ff3405d4baceb60fb3a8f05cf3f5}

\begin{DoxyCompactList}\small\item\em The energy for a digital muon calorimeter hit, units Ge\-V. \end{DoxyCompactList}\item 
float {\bf m\-\_\-max\-H\-Cal\-Hit\-Hadronic\-Energy}\label{classCaloHitCreator_1_1Settings_a1bbe7516e6a2c66b81f15dbe48a7bbc1}

\begin{DoxyCompactList}\small\item\em The maximum hadronic energy allowed for a single hcal hit. \end{DoxyCompactList}\item 
int {\bf m\-\_\-n\-Outer\-Sampling\-Layers}\label{classCaloHitCreator_1_1Settings_ae87151346a12f5194fd485d09d370a66}

\begin{DoxyCompactList}\small\item\em Number of layers from edge for hit to be flagged as an outer layer hit. \end{DoxyCompactList}\item 
float {\bf m\-\_\-layers\-From\-Edge\-Max\-Rear\-Distance}\label{classCaloHitCreator_1_1Settings_a0d35e3f8ba8f9c25e13642078af2854f}

\begin{DoxyCompactList}\small\item\em Maximum number of layers from candidate outer layer hit to rear of detector. \end{DoxyCompactList}\item 
int {\bf m\-\_\-h\-Cal\-End\-Cap\-Inner\-Symmetry\-Order}\label{classCaloHitCreator_1_1Settings_a40ea16e8c9c072a55301da16b9695b2f}

\begin{DoxyCompactList}\small\item\em H\-Cal end cap inner symmetry order (missing from I\-L\-D00 gear file) \end{DoxyCompactList}\item 
float {\bf m\-\_\-h\-Cal\-End\-Cap\-Inner\-Phi\-Coordinate}\label{classCaloHitCreator_1_1Settings_a62c75a4852e97996e86e1d1e762deee0}

\begin{DoxyCompactList}\small\item\em H\-Cal end cap inner phi coordinate (missing from I\-L\-D00 gear file) \end{DoxyCompactList}\item 
int {\bf m\-\_\-strip\-Splitting\-On}\label{classCaloHitCreator_1_1Settings_aed3e07989ddcee3d328414443e6b366b}

\begin{DoxyCompactList}\small\item\em To use S\-S\-A, this should be true (default is false) \end{DoxyCompactList}\item 
int {\bf m\-\_\-use\-Ecal\-Sc\-Layers}\label{classCaloHitCreator_1_1Settings_ab3f72bc272a75dafe52e4cbc0704e58e}

\begin{DoxyCompactList}\small\item\em To use scintillator layers $\sim$ hybrid E\-C\-A\-L, this should be true (default is false) \end{DoxyCompactList}\item 
float {\bf m\-\_\-e\-Cal\-Si\-To\-Mip}\label{classCaloHitCreator_1_1Settings_aff2acd034e23312427dae40116df04b3}

\begin{DoxyCompactList}\small\item\em The calibration from deposited Si-\/layer energy to mip. \end{DoxyCompactList}\item 
float {\bf m\-\_\-e\-Cal\-Sc\-To\-Mip}\label{classCaloHitCreator_1_1Settings_aa4f4ffa0b9f5221f29846810cdace927}

\begin{DoxyCompactList}\small\item\em The calibration from deposited Sc-\/layer energy to mip. \end{DoxyCompactList}\item 
float {\bf m\-\_\-e\-Cal\-Si\-Mip\-Threshold}\label{classCaloHitCreator_1_1Settings_a07e9572d6a1bd478f9b6941cc2763358}

\begin{DoxyCompactList}\small\item\em Threshold for creating calo hits in the Si-\/layers of E\-C\-A\-L, units mip. \end{DoxyCompactList}\item 
float {\bf m\-\_\-e\-Cal\-Sc\-Mip\-Threshold}\label{classCaloHitCreator_1_1Settings_a23aa3c62ba653d89cf41a0ad5efb2cbe}

\begin{DoxyCompactList}\small\item\em Threshold for creating calo hits in the Sc-\/layers of E\-C\-A\-L, units mip. \end{DoxyCompactList}\item 
float {\bf m\-\_\-e\-Cal\-Si\-To\-E\-M\-Ge\-V}\label{classCaloHitCreator_1_1Settings_aa969d123e4018267db730fd70aa0d2c9}

\begin{DoxyCompactList}\small\item\em The calibration from deposited Si-\/layer energy to E\-M energy. \end{DoxyCompactList}\item 
float {\bf m\-\_\-e\-Cal\-Sc\-To\-E\-M\-Ge\-V}\label{classCaloHitCreator_1_1Settings_a38b726437761a200d8c31e2ce8e29585}

\begin{DoxyCompactList}\small\item\em The calibration from deposited Sc-\/layer energy to E\-M energy. \end{DoxyCompactList}\item 
float {\bf m\-\_\-e\-Cal\-Si\-To\-Had\-Ge\-V\-Barrel}\label{classCaloHitCreator_1_1Settings_a11e43cb06460757d872186fe0f1ee6c6}

\begin{DoxyCompactList}\small\item\em The calibration from deposited Si-\/layer energy on the enecaps to hadronic energy. \end{DoxyCompactList}\item 
float {\bf m\-\_\-e\-Cal\-Sc\-To\-Had\-Ge\-V\-Barrel}\label{classCaloHitCreator_1_1Settings_a285a306ce04a9117e165e1036a564a27}

\begin{DoxyCompactList}\small\item\em The calibration from deposited Sc-\/layer energy on the endcaps to hadronic energy. \end{DoxyCompactList}\item 
float {\bf m\-\_\-e\-Cal\-Si\-To\-Had\-Ge\-V\-End\-Cap}\label{classCaloHitCreator_1_1Settings_a0bb8e9910294af906ee71803d0232ad7}

\begin{DoxyCompactList}\small\item\em The calibration from deposited Si-\/layer energy on the enecaps to hadronic energy. \end{DoxyCompactList}\item 
float {\bf m\-\_\-e\-Cal\-Sc\-To\-Had\-Ge\-V\-End\-Cap}\label{classCaloHitCreator_1_1Settings_a7fedb7a8bbc43110f911d4499f218123}

\begin{DoxyCompactList}\small\item\em The calibration from deposited Sc-\/layer energy on the endcaps to hadronic energy. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
\doxyref{Settings}{p.}{classCaloHitCreator_1_1Settings} class. 

The documentation for this class was generated from the following files\-:\begin{DoxyCompactItemize}
\item 
Calo\-Hit\-Creator.\-h\item 
Calo\-Hit\-Creator.\-cc\end{DoxyCompactItemize}
