\section{Ti\-Xml\-Unknown Class Reference}
\label{classTiXmlUnknown}\index{Ti\-Xml\-Unknown@{Ti\-Xml\-Unknown}}


Any tag that tiny\-Xml doesn't recognize is saved as an unknown.  




{\ttfamily \#include $<$tinyxml.\-h$>$}

Inheritance diagram for Ti\-Xml\-Unknown\-:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=3.000000cm]{classTiXmlUnknown}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
{\bfseries Ti\-Xml\-Unknown} (const {\bf Ti\-Xml\-Unknown} \&copy)\label{classTiXmlUnknown_abe798ff4feea31474850c7f0de6bdf5e}

\item 
void {\bfseries operator=} (const {\bf Ti\-Xml\-Unknown} \&copy)\label{classTiXmlUnknown_a5097fe228cd5ad4edcdddf02c334fd83}

\item 
virtual {\bf Ti\-Xml\-Node} $\ast$ {\bf Clone} () const \label{classTiXmlUnknown_a675c4b2684af35e4c7649b7fd5ae598d}

\begin{DoxyCompactList}\small\item\em Creates a copy of this Unknown and returns it. \end{DoxyCompactList}\item 
virtual void {\bf Print} (F\-I\-L\-E $\ast$cfile, int depth) const 
\begin{DoxyCompactList}\small\item\em All Tiny\-Xml classes can print themselves to a filestream or the string class (\doxyref{Ti\-Xml\-String}{p.}{classTiXmlString} in non-\/\-S\-T\-L mode, std\-::string in S\-T\-L mode.) Either or both cfile and str can be null. \end{DoxyCompactList}\item 
virtual const char $\ast$ {\bfseries Parse} (const char $\ast$p, {\bf Ti\-Xml\-Parsing\-Data} $\ast$data, Ti\-Xml\-Encoding encoding)\label{classTiXmlUnknown_aa51c2694e4177b5f0b5429ee5a81b58d}

\item 
virtual const {\bf Ti\-Xml\-Unknown} $\ast$ {\bf To\-Unknown} () const \label{classTiXmlUnknown_ab0313e5fe77987d746ac1a97a254419d}

\begin{DoxyCompactList}\small\item\em Cast to a more defined type. Will return null not of the requested type. \end{DoxyCompactList}\item 
virtual {\bf Ti\-Xml\-Unknown} $\ast$ {\bf To\-Unknown} ()\label{classTiXmlUnknown_a67c9fd22940e8c47f706a72cdd2e332c}

\begin{DoxyCompactList}\small\item\em Cast to a more defined type. Will return null not of the requested type. \end{DoxyCompactList}\item 
virtual bool {\bf Accept} ({\bf Ti\-Xml\-Visitor} $\ast$content) const \label{classTiXmlUnknown_a4e54d7482e05a837cf83c925cc683380}

\begin{DoxyCompactList}\small\item\em Walk the X\-M\-L tree visiting this node and all of its children. \end{DoxyCompactList}\end{DoxyCompactItemize}
\subsection*{Protected Member Functions}
\begin{DoxyCompactItemize}
\item 
void {\bfseries Copy\-To} ({\bf Ti\-Xml\-Unknown} $\ast$target) const \label{classTiXmlUnknown_a08ca7b225a2bcb604d3c72e199d33408}

\item 
virtual void {\bfseries Stream\-In} (std\-::istream $\ast$in, T\-I\-X\-M\-L\-\_\-\-S\-T\-R\-I\-N\-G $\ast$tag)\label{classTiXmlUnknown_ad3f8fcc1efe364ddd8f43ef9a1046300}

\end{DoxyCompactItemize}
\subsection*{Additional Inherited Members}


\subsection{Detailed Description}
Any tag that tiny\-Xml doesn't recognize is saved as an unknown. 

It is a tag of text, but should not be modified. It will be written back to the X\-M\-L, unchanged, when the file is saved.

D\-T\-D tags get thrown into Ti\-Xml\-Unknowns. 

\subsection{Member Function Documentation}
\index{Ti\-Xml\-Unknown@{Ti\-Xml\-Unknown}!Print@{Print}}
\index{Print@{Print}!TiXmlUnknown@{Ti\-Xml\-Unknown}}
\subsubsection[{Print}]{\setlength{\rightskip}{0pt plus 5cm}void Ti\-Xml\-Unknown\-::\-Print (
\begin{DoxyParamCaption}
\item[{F\-I\-L\-E $\ast$}]{cfile, }
\item[{int}]{depth}
\end{DoxyParamCaption}
) const\hspace{0.3cm}{\ttfamily [virtual]}}\label{classTiXmlUnknown_a025f19c21ef01ea9be50febb8fe0ba06}


All Tiny\-Xml classes can print themselves to a filestream or the string class (\doxyref{Ti\-Xml\-String}{p.}{classTiXmlString} in non-\/\-S\-T\-L mode, std\-::string in S\-T\-L mode.) Either or both cfile and str can be null. 

This is a formatted print, and will insert tabs and newlines.

(For an unformatted stream, use the $<$$<$ operator.) 

Implements {\bf Ti\-Xml\-Base} \doxyref{}{p.}{classTiXmlBase_a0de56b3f2ef14c65091a3b916437b512}.



The documentation for this class was generated from the following files\-:\begin{DoxyCompactItemize}
\item 
tinyxml.\-h\item 
tinyxml.\-cc\item 
tinyxmlparser.\-cc\end{DoxyCompactItemize}
