\hypertarget{classvertex__lcfi_1_1ZVTOP_1_1VertexFuncMaxFinderClassicStepper}{\subsection{vertex\-\_\-lcfi\-:\-:Z\-V\-T\-O\-P\-:\-:Vertex\-Func\-Max\-Finder\-Classic\-Stepper Class Reference}
\label{classvertex__lcfi_1_1ZVTOP_1_1VertexFuncMaxFinderClassicStepper}\index{vertex\-\_\-lcfi\-::\-Z\-V\-T\-O\-P\-::\-Vertex\-Func\-Max\-Finder\-Classic\-Stepper@{vertex\-\_\-lcfi\-::\-Z\-V\-T\-O\-P\-::\-Vertex\-Func\-Max\-Finder\-Classic\-Stepper}}
}


Robust \hyperlink{classvertex__lcfi_1_1ZVTOP_1_1VertexFuncMaxFinder}{Vertex\-Func\-Max\-Finder}.  




{\ttfamily \#include $<$vertexfuncmaxfinderclassicstepper.\-h$>$}



Inheritance diagram for vertex\-\_\-lcfi\-:\-:Z\-V\-T\-O\-P\-:\-:Vertex\-Func\-Max\-Finder\-Classic\-Stepper\-:


Collaboration diagram for vertex\-\_\-lcfi\-:\-:Z\-V\-T\-O\-P\-:\-:Vertex\-Func\-Max\-Finder\-Classic\-Stepper\-:


\subsubsection{Detailed Description}
Robust \hyperlink{classvertex__lcfi_1_1ZVTOP_1_1VertexFuncMaxFinder}{Vertex\-Func\-Max\-Finder}. 

Similar to original S\-L\-D implementaion, minimises along each axis in turn by stepping till minimum reached. Currently hard wired step size. \begin{DoxyAuthor}{Author}
Ben Jeffery (\href{mailto:b.jeffery1@physics.ox.ac.uk}{\tt b.\-jeffery1@physics.\-ox.\-ac.\-uk}) 
\end{DoxyAuthor}
\begin{DoxyVersion}{Version}
0.\-1 
\end{DoxyVersion}
\begin{DoxyDate}{Date}
20/09/05 
\end{DoxyDate}


The documentation for this class was generated from the following file\-:\begin{DoxyCompactItemize}
\item 
vertexfuncmaxfinderclassicstepper.\-h\end{DoxyCompactItemize}
