\section{Fitter\-Exception Class Reference}
\label{classFitterException}\index{Fitter\-Exception@{Fitter\-Exception}}
Inheritance diagram for Fitter\-Exception\-:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classFitterException}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
{\bfseries Fitter\-Exception} (const std\-::string \&text)\label{classFitterException_ad2fbce184431e5cd04047d8c554c725d}

\item 
virtual const char $\ast$ {\bfseries what} () const   throw ()\label{classFitterException_a815af12d97094073dc92b5cad0e15bd9}

\end{DoxyCompactItemize}
\subsection*{Protected Attributes}
\begin{DoxyCompactItemize}
\item 
std\-::string {\bfseries message}\label{classFitterException_a175ce31d6908beded1099503bf506f2a}

\end{DoxyCompactItemize}


The documentation for this class was generated from the following file\-:\begin{DoxyCompactItemize}
\item 
Fitter.\-h\end{DoxyCompactItemize}
