\section{F\-T\-D\-Helix\-Fitter\-Exception Class Reference}
\label{classFTDHelixFitterException}\index{F\-T\-D\-Helix\-Fitter\-Exception@{F\-T\-D\-Helix\-Fitter\-Exception}}
Inheritance diagram for F\-T\-D\-Helix\-Fitter\-Exception\-:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classFTDHelixFitterException}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
{\bfseries F\-T\-D\-Helix\-Fitter\-Exception} (const std\-::string \&text)\label{classFTDHelixFitterException_aea113c1e67e9526b288cdacfbc30134f}

\item 
virtual const char $\ast$ {\bfseries what} () const   throw ()\label{classFTDHelixFitterException_ae757b86aba030b64bf60c407cb0e3d8a}

\end{DoxyCompactItemize}
\subsection*{Protected Attributes}
\begin{DoxyCompactItemize}
\item 
std\-::string {\bfseries message}\label{classFTDHelixFitterException_ad7b90ff86e1342f4c10d0489ba55a3d7}

\end{DoxyCompactItemize}


The documentation for this class was generated from the following file\-:\begin{DoxyCompactItemize}
\item 
F\-T\-D\-Helix\-Fitter.\-h\end{DoxyCompactItemize}
