\hypertarget{namespace_geant4_optical_calorimeter_action}{\section{Geant4\-Optical\-Calorimeter\-Action Namespace Reference}
\label{namespace_geant4_optical_calorimeter_action}\index{Geant4\-Optical\-Calorimeter\-Action@{Geant4\-Optical\-Calorimeter\-Action}}
}


Sensitive detector meant for optical calorimeters.  




\subsection{Detailed Description}
Sensitive detector meant for optical calorimeters. 