\hypertarget{_rho_phi_projection_8cpp}{\section{/opt/ilcsoft/\-H\-E\-A\-D-\/2016-\/12-\/02/\-D\-D4hep/\-H\-E\-A\-D/\-D\-D\-Eve/src/\-Rho\-Phi\-Projection.cpp File Reference}
\label{_rho_phi_projection_8cpp}\index{/opt/ilcsoft/\-H\-E\-A\-D-\/2016-\/12-\/02/\-D\-D4hep/\-H\-E\-A\-D/\-D\-D\-Eve/src/\-Rho\-Phi\-Projection.\-cpp@{/opt/ilcsoft/\-H\-E\-A\-D-\/2016-\/12-\/02/\-D\-D4hep/\-H\-E\-A\-D/\-D\-D\-Eve/src/\-Rho\-Phi\-Projection.\-cpp}}
}
{\ttfamily \#include \char`\"{}D\-D\-Eve/\-Rho\-Phi\-Projection.\-h\char`\"{}}\\*
{\ttfamily \#include \char`\"{}D\-D\-Eve/\-Factories.\-h\char`\"{}}\\*
\subsection*{Functions}
\begin{DoxyCompactItemize}
\item 
\hyperlink{_rho_phi_projection_8cpp_ab4c1e75725a5b317a756aff574b88e0e}{Class\-Imp} (\hyperlink{class_d_d4hep_1_1_rho_phi_projection}{Rho\-Phi\-Projection}) \hyperlink{class_d_d4hep_1_1_rho_phi_projection}{Rho\-Phi\-Projection}
\begin{DoxyCompactList}\small\item\em Initializing constructor. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Function Documentation}
\hypertarget{_rho_phi_projection_8cpp_ab4c1e75725a5b317a756aff574b88e0e}{\index{Rho\-Phi\-Projection.\-cpp@{Rho\-Phi\-Projection.\-cpp}!Class\-Imp@{Class\-Imp}}
\index{Class\-Imp@{Class\-Imp}!RhoPhiProjection.cpp@{Rho\-Phi\-Projection.\-cpp}}
\subsubsection[{Class\-Imp}]{\setlength{\rightskip}{0pt plus 5cm}Class\-Imp (
\begin{DoxyParamCaption}
\item[{{\bf Rho\-Phi\-Projection}}]{}
\end{DoxyParamCaption}
)}}\label{_rho_phi_projection_8cpp_ab4c1e75725a5b317a756aff574b88e0e}


Initializing constructor. 



Definition at line 22 of file Rho\-Phi\-Projection.\-cpp.

