\hypertarget{_geant4_assembly_volume_8h}{\section{/opt/ilcsoft/\-H\-E\-A\-D-\/2016-\/12-\/02/\-D\-D4hep/\-H\-E\-A\-D/\-D\-D\-G4/include/\-D\-D\-G4/\-Geant4\-Assembly\-Volume.h File Reference}
\label{_geant4_assembly_volume_8h}\index{/opt/ilcsoft/\-H\-E\-A\-D-\/2016-\/12-\/02/\-D\-D4hep/\-H\-E\-A\-D/\-D\-D\-G4/include/\-D\-D\-G4/\-Geant4\-Assembly\-Volume.\-h@{/opt/ilcsoft/\-H\-E\-A\-D-\/2016-\/12-\/02/\-D\-D4hep/\-H\-E\-A\-D/\-D\-D\-G4/include/\-D\-D\-G4/\-Geant4\-Assembly\-Volume.\-h}}
}
{\ttfamily \#include \char`\"{}G4\-Assembly\-Volume.\-hh\char`\"{}}\\*
\subsection*{Classes}
\begin{DoxyCompactItemize}
\item 
class \hyperlink{class_d_d4hep_1_1_simulation_1_1_geant4_assembly_volume}{D\-D4hep\-::\-Simulation\-::\-Geant4\-Assembly\-Volume}
\begin{DoxyCompactList}\small\item\em Hack! Wrapper around \hyperlink{class_g4_assembly_volume}{G4\-Assembly\-Volume} to access protected members. \end{DoxyCompactList}\end{DoxyCompactItemize}
\subsection*{Namespaces}
\begin{DoxyCompactItemize}
\item 
\hyperlink{namespace_d_d4hep}{D\-D4hep}
\begin{DoxyCompactList}\small\item\em Namespace for the A\-I\-D\-A detector description toolkit. \end{DoxyCompactList}\item 
\hyperlink{namespace_d_d4hep_1_1_simulation}{D\-D4hep\-::\-Simulation}
\begin{DoxyCompactList}\small\item\em Namespace for the Geant4 based simulation part of the A\-I\-D\-A detector description toolkit. \end{DoxyCompactList}\end{DoxyCompactItemize}
\subsection*{Macros}
\begin{DoxyCompactItemize}
\item 
\#define \hyperlink{_geant4_assembly_volume_8h_a6a1d6e1a12975a4e9a0b5b952e79eaad}{private}~public
\end{DoxyCompactItemize}


\subsection{Macro Definition Documentation}
\hypertarget{_geant4_assembly_volume_8h_a6a1d6e1a12975a4e9a0b5b952e79eaad}{\index{Geant4\-Assembly\-Volume.\-h@{Geant4\-Assembly\-Volume.\-h}!private@{private}}
\index{private@{private}!Geant4AssemblyVolume.h@{Geant4\-Assembly\-Volume.\-h}}
\subsubsection[{private}]{\setlength{\rightskip}{0pt plus 5cm}\#define private~public}}\label{_geant4_assembly_volume_8h_a6a1d6e1a12975a4e9a0b5b952e79eaad}


Definition at line 15 of file Geant4\-Assembly\-Volume.\-h.

